Physiquement je ne vais pas bien mais le cerveau fonctionne toujours, affirme Louis Van Gaal

L’entraîneur des Pays-Bas Louis van Gaal s’est blessé à la hanche en tombant de vélo dimanche, mais a révélé qu’il pourra entraîner son équipe lors des éliminatoires de la Coupe du monde mardi contre la Norvège. L’homme de 70 ans n’a pas pu assister en personne à la conférence de presse de lundi mais est apparu sur vidéo.

Louis van Gaal a subi une blessure malheureuse en tombant alors qu’il faisait du vélo près de l’hôtel de l’équipe et a été emmené à l’hôpital voisin pour des tests. Le diagnostic médical a confirmé qu’il avait subi une blessure à la hanche lors de l’incident à vélo, alors que les craintes grandissaient qu’il pourrait être contraint de manquer le match crucial de qualification pour la Coupe du monde de mardi contre la Norvège. L’ancien manager de Manchester United a utilisé l’aide de sa voiturette de golf pour effectuer la séance d’entraînement de lundi avant que le groupe ne décide de l’égalité mardi. Les Pays-Bas n’ont besoin que d’un tirage au sort pour prétendre à leur place à l’édition de l’année prochaine de la Coupe du monde au Qatar.

Van Gaal n’est pas étranger à une blessure subie en tant que manager lorsqu’il s’est cassé un péroné et sa cheville lorsqu’il était l’entraîneur de l’AZ Alkmaar en 2007. Le Néerlandais a entraîné plusieurs séances d’entraînement depuis le siège de sa voiturette de golf à cette époque. Le joueur de 70 ans n’a pas pu assister en personne à la conférence de presse de lundi, mais a fait une apparition par liaison vidéo alors qu’il était assis sur un fauteuil roulant et a affirmé qu’il pourrait être dans la pirogue pour le match.

« Je souffre beaucoup. C’est pourquoi j’étais dans un buggy pendant l’entraînement. Physiquement, ce n’est pas bon, mais le cerveau fonctionne toujours. Je peux tout faire. Il y a des moyens à ma disposition. Ce n’est pas joli, mais le coaching est verbal. J’ai fait tout à la formation que j’aurais fait autrement. Ils cherchent une solution. Je sais qu’il y a un ascenseur dans le stade”, a déclaré Van Gaal aux journalistes lors de sa conférence de presse d’avant-match.

The post Physiquement je ne vais pas bien mais le cerveau fonctionne toujours, affirme Louis Van Gaal first appeared on valideapp.