La rivalité avec Keylor Navas n’a aucun effet sur les performances mais elle me dérange, affirme Gianluigi Donnarumma

La star du Paris Saint-Germain, Gianluigi Donnarumma, a avoué que même si sa bataille pour la place de titulaire avec Keylor Navas n’affecte pas ses performances, cela lui fait mal d’être sur le banc. Le vainqueur de l’Euro 2020 a eu du mal à obtenir un temps de jeu constant pour sa nouvelle équipe, avec seulement 7 apparitions.

Ayant en moyenne 30 matches de championnat depuis ses débuts avec l’AC Milan lors de la saison 2015/16, beaucoup s’attendaient à ce que cette tendance se poursuive pour Gianluigi Donnarumma au Paris Saint-Germain. C’était surtout après les performances impressionnantes du gardien de but à l’Euro 2020, où il a également remporté le tournoi et le prix du meilleur gardien de but. Cependant, le déménagement à Paris n’a pas encore fonctionné pour l’une ou l’autre des parties, le joueur de 22 ans ayant jusqu’à présent une option de rotation.

L’Italien a partagé les tâches de gardien de but avec Keylor Navas et n’a donc fait que sept apparitions dans toutes les compétitions pour le club. Cela comprend cinq en Ligue 1 et deux en Ligue des champions, mais Donnarumma a admis que malgré la rotation, cela n’avait “aucun effet” sur ses performances. L’Italien a également ajouté que les choses n’avaient pas été faciles pour lui et il espère que la situation changera bientôt.

“Cela n’a aucun effet sur mes performances, mais cela me dérange. Ce n’est pas facile, car j’avais l’habitude de toujours commencer et parfois ça fait mal d’être sur le banc. Mais je suis sûr que la situation sera résolue”, a déclaré Donnarumma, Objectif signalé.

The post La rivalité avec Keylor Navas n’a aucun effet sur les performances mais elle me dérange, affirme Gianluigi Donnarumma first appeared on valideapp.